Data Type:                         AVAPS SOUNDING DATA, Channel 4
Project ID:                        24022717309 29WSE IOP39, 24022717309 29WSE IOP39
Launch Site Type/Site ID:          AFRC C-130J, ---
Launch Location (lon,lat,alt):     -999, -999, -999 -999 -999
GMT Launch Time (y,m,d,h,m,s):     2024, 02, 28, 00:12:31
Sonde Id:                          234350310
/
/
/
System Operator/Comments:          HEMPHILL/BARNABY,broken drop tube, No Launch Detect
Post Processing Comments:          Aspen V3.4.7; Created on 28 Feb 2024 00:35 UTC
/
 Time  Press  Temp  Dewpt  RH    Uwind  Vwind  Wspd  Dir   dZ      Lon     Lat    Rng   Az     Alt    Qp   Qt   Qh   Qu   Qv   Quv
  sec    mb     C     C     %     m/s    m/s   m/s   deg   m/s     deg     deg     km   deg     m     mb   C    %    m/s  m/s  m/s
------ ------ ----- ----- ----- ------ ------ ----- ----- ----- -------- ------- ----- ----- ------- ---- ---- ---- ---- ---- ----
  34.0  327.3 -42.3 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0     0.0 99.0 99.0 99.0 99.0 99.0 99.0
  33.5  326.9 -42.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0     8.8 99.0 99.0 99.0 99.0 99.0 99.0
  33.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  33.0  326.5 -42.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    17.2 99.0 99.0 99.0 99.0 99.0 99.0
  32.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  32.5  326.1 -42.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    25.5 99.0 99.0 99.0 99.0 99.0 99.0
  32.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  32.0  325.7 -42.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    33.7 99.0 99.0 99.0 99.0 99.0 99.0
  31.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  31.5  325.3 -42.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    41.7 99.0 99.0 99.0 99.0 99.0 99.0
  31.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  31.0  324.9 -42.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    49.7 99.0 99.0 99.0 99.0 99.0 99.0
  30.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  30.5  324.5 -42.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0    57.9 99.0 99.0 99.0 99.0 99.0 99.0
  30.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  30.0  324.1 -42.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0    66.1 99.0 99.0 99.0 99.0 99.0 99.0
  29.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  29.5  323.7 -42.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0    74.3 99.0 99.0 99.0 99.0 99.0 99.0
  29.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  29.0  323.3 -42.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0    82.5 99.0 99.0 99.0 99.0 99.0 99.0
  28.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.5  322.9 -43.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0    90.7 99.0 99.0 99.0 99.0 99.0 99.0
  28.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.0  322.5 -43.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0    99.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.5  322.1 -43.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   107.2 99.0 99.0 99.0 99.0 99.0 99.0
  27.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.0  321.8 -43.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   115.5 99.0 99.0 99.0 99.0 99.0 99.0
  26.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.5  321.4 -43.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   123.7 99.0 99.0 99.0 99.0 99.0 99.0
  26.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.0  321.0 -43.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   131.9 99.0 99.0 99.0 99.0 99.0 99.0
  25.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  25.5  320.6 -43.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   140.1 99.0 99.0 99.0 99.0 99.0 99.0
  25.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  25.0  320.2 -43.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   148.2 99.0 99.0 99.0 99.0 99.0 99.0
  24.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  24.5  319.8 -43.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   156.4 99.0 99.0 99.0 99.0 99.0 99.0
  24.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  24.0  319.4 -43.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   164.6 99.0 99.0 99.0 99.0 99.0 99.0
  23.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.5  319.0 -43.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   172.7 99.0 99.0 99.0 99.0 99.0 99.0
  23.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.0  318.6 -43.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   180.9 99.0 99.0 99.0 99.0 99.0 99.0
  22.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  22.5  318.2 -43.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   189.1 99.0 99.0 99.0 99.0 99.0 99.0
  22.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  22.0  317.9 -43.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   197.3 99.0 99.0 99.0 99.0 99.0 99.0
  21.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  21.5  317.5 -43.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   205.5 99.0 99.0 99.0 99.0 99.0 99.0
  21.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  21.0  317.1 -43.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   213.8 99.0 99.0 99.0 99.0 99.0 99.0
  20.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  20.5  316.7 -44.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   222.1 99.0 99.0 99.0 99.0 99.0 99.0
  20.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  20.0  316.3 -44.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   230.4 99.0 99.0 99.0 99.0 99.0 99.0
  19.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  19.5  315.9 -44.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   238.7 99.0 99.0 99.0 99.0 99.0 99.0
  19.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  19.0  315.5 -44.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   247.1 99.0 99.0 99.0 99.0 99.0 99.0
  18.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  18.5  315.1 -44.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   255.5 99.0 99.0 99.0 99.0 99.0 99.0
  18.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  18.0  314.7 -44.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   263.8 99.0 99.0 99.0 99.0 99.0 99.0
  17.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  17.5  314.3 -44.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   272.1 99.0 99.0 99.0 99.0 99.0 99.0
  17.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  17.0  313.9 -44.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   280.4 99.0 99.0 99.0 99.0 99.0 99.0
  16.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  16.5  313.6 -44.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   288.7 99.0 99.0 99.0 99.0 99.0 99.0
  16.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  16.0  313.2 -44.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   297.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.5  312.8 -44.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   305.3 99.0 99.0 99.0 99.0 99.0 99.0
  15.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.0  312.4 -44.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   313.6 99.0 99.0 99.0 99.0 99.0 99.0
  14.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  14.5  312.0 -44.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   321.9 99.0 99.0 99.0 99.0 99.0 99.0
  14.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  14.0  311.6 -44.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   330.3 99.0 99.0 99.0 99.0 99.0 99.0
  13.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  13.5  311.2 -44.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   338.6 99.0 99.0 99.0 99.0 99.0 99.0
  13.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  13.0  310.8 -44.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   347.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.5  310.4 -44.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   355.4 99.0 99.0 99.0 99.0 99.0 99.0
  12.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.0  310.1 -45.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   363.7 99.0 99.0 99.0 99.0 99.0 99.0
  11.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  11.5  309.7 -45.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   372.1 99.0 99.0 99.0 99.0 99.0 99.0
  11.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  11.0  309.3 -45.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   380.5 99.0 99.0 99.0 99.0 99.0 99.0
  10.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  10.5  308.9 -45.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   388.8 99.0 99.0 99.0 99.0 99.0 99.0
  10.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  10.0  308.5 -45.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   397.1 99.0 99.0 99.0 99.0 99.0 99.0
   9.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   9.5  308.1 -45.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   405.4 99.0 99.0 99.0 99.0 99.0 99.0
   9.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   9.0  307.7 -45.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   413.7 99.0 99.0 99.0 99.0 99.0 99.0
   8.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   8.5  307.4 -45.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   421.9 99.0 99.0 99.0 99.0 99.0 99.0
   8.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   8.0  307.0 -45.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   430.1 99.0 99.0 99.0 99.0 99.0 99.0
   7.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   7.5  306.6 -45.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   438.3 99.0 99.0 99.0 99.0 99.0 99.0
   7.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   7.0  306.3 -45.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   445.9 99.0 99.0 99.0 99.0 99.0 99.0
   6.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  -1.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
