Data Type:                         AVAPS SOUNDING DATA, Channel 4
Project ID:                        23011318304 11WSE IOP14, 23011318304 11WSE IOP14
Launch Site Type/Site ID:          AFRC C-130J, ---
Launch Location (lon,lat,alt):     128 25.98'W, 35 49.79'N, -128.43300 35.82990 9508
GMT Launch Time (y,m,d,h,m,s):     2023, 01, 14, 02:00:35
Sonde Id:                          224325136
/
/
/
System Operator/Comments:          none,none, No Winds
Post Processing Comments:          Aspen V3.4.7; Created on 14 Jan 2023 02:03 UTC
/
 Time  Press  Temp  Dewpt  RH    Uwind  Vwind  Wspd  Dir   dZ      Lon     Lat    Rng   Az     Alt    Qp   Qt   Qh   Qu   Qv   Quv
  sec    mb     C     C     %     m/s    m/s   m/s   deg   m/s     deg     deg     km   deg     m     mb   C    %    m/s  m/s  m/s
------ ------ ----- ----- ----- ------ ------ ----- ----- ----- -------- ------- ----- ----- ------- ---- ---- ---- ---- ---- ----
  63.5  333.3 -37.4 -44.4  49.1  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0     0.0 99.0 99.0 99.0 99.0 99.0 99.0
  63.0  332.9 -37.4 -44.4  49.1  999.0  999.0 999.0 999.0 -15.8  999.000 999.000 999.0 999.0     8.5 99.0 99.0 99.0 99.0 99.0 99.0
  62.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  62.5  332.5 -37.4 -44.5  49.2  999.0  999.0 999.0 999.0 -15.8  999.000 999.000 999.0 999.0    16.9 99.0 99.0 99.0 99.0 99.0 99.0
  62.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  62.0  332.1 -37.5 -44.5  49.2  999.0  999.0 999.0 999.0 -15.7  999.000 999.000 999.0 999.0    25.0 99.0 99.0 99.0 99.0 99.0 99.0
  61.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  61.5  331.7 -37.6 -44.6  49.3  999.0  999.0 999.0 999.0 -15.7  999.000 999.000 999.0 999.0    33.0 99.0 99.0 99.0 99.0 99.0 99.0
  61.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  61.0  331.4 -37.6 -44.6  49.4  999.0  999.0 999.0 999.0 -15.6  999.000 999.000 999.0 999.0    40.8 99.0 99.0 99.0 99.0 99.0 99.0
  60.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  60.5  331.0 -37.7 -44.7  49.5  999.0  999.0 999.0 999.0 -15.5  999.000 999.000 999.0 999.0    48.4 99.0 99.0 99.0 99.0 99.0 99.0
  60.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  60.0  330.6 -37.8 -44.7  49.6  999.0  999.0 999.0 999.0 -15.5  999.000 999.000 999.0 999.0    56.0 99.0 99.0 99.0 99.0 99.0 99.0
  59.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  59.5  330.3 -37.8 -44.8  49.7  999.0  999.0 999.0 999.0 -15.4  999.000 999.000 999.0 999.0    63.7 99.0 99.0 99.0 99.0 99.0 99.0
  59.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  59.0  329.9 -37.9 -44.8  49.8  999.0  999.0 999.0 999.0 -15.3  999.000 999.000 999.0 999.0    71.4 99.0 99.0 99.0 99.0 99.0 99.0
  58.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  58.5  329.5 -38.0 -44.9  50.0  999.0  999.0 999.0 999.0 -15.3  999.000 999.000 999.0 999.0    79.1 99.0 99.0 99.0 99.0 99.0 99.0
  58.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  58.0  329.2 -38.1 -44.9  50.1  999.0  999.0 999.0 999.0 -15.2  999.000 999.000 999.0 999.0    86.8 99.0 99.0 99.0 99.0 99.0 99.0
  57.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  57.5  328.8 -38.1 -44.9  50.3  999.0  999.0 999.0 999.0 -15.2  999.000 999.000 999.0 999.0    94.4 99.0 99.0 99.0 99.0 99.0 99.0
  57.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  57.0  328.4 -38.2 -45.0  50.4  999.0  999.0 999.0 999.0 -15.1  999.000 999.000 999.0 999.0   101.9 99.0 99.0 99.0 99.0 99.0 99.0
  56.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  56.5  328.1 -38.3 -45.0  50.6  999.0  999.0 999.0 999.0 -15.1  999.000 999.000 999.0 999.0   109.5 99.0 99.0 99.0 99.0 99.0 99.0
  56.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  56.0  327.7 -38.3 -45.0  50.8  999.0  999.0 999.0 999.0 -15.0  999.000 999.000 999.0 999.0   117.0 99.0 99.0 99.0 99.0 99.0 99.0
  55.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  55.5  327.4 -38.4 -45.1  50.9  999.0  999.0 999.0 999.0 -15.0  999.000 999.000 999.0 999.0   124.5 99.0 99.0 99.0 99.0 99.0 99.0
  55.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  55.0  327.0 -38.5 -45.1  51.0  999.0  999.0 999.0 999.0 -15.0  999.000 999.000 999.0 999.0   132.0 99.0 99.0 99.0 99.0 99.0 99.0
  54.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  54.5  326.7 -38.6 -45.2  51.0  999.0  999.0 999.0 999.0 -15.0  999.000 999.000 999.0 999.0   139.4 99.0 99.0 99.0 99.0 99.0 99.0
  54.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  54.0  326.3 -38.6 -45.3  51.0  999.0  999.0 999.0 999.0 -15.0  999.000 999.000 999.0 999.0   146.9 99.0 99.0 99.0 99.0 99.0 99.0
  53.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  53.5  325.9 -38.7 -45.4  50.9  999.0  999.0 999.0 999.0 -15.1  999.000 999.000 999.0 999.0   154.4 99.0 99.0 99.0 99.0 99.0 99.0
  53.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  53.0  325.6 -38.8 -45.5  50.7  999.0  999.0 999.0 999.0 -15.1  999.000 999.000 999.0 999.0   161.9 99.0 99.0 99.0 99.0 99.0 99.0
  52.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  52.5  325.2 -38.8 -45.6  50.4  999.0  999.0 999.0 999.0 -15.2  999.000 999.000 999.0 999.0   169.5 99.0 99.0 99.0 99.0 99.0 99.0
  52.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  52.0  324.9 -38.9 -45.7  50.1  999.0  999.0 999.0 999.0 -15.2  999.000 999.000 999.0 999.0   177.1 99.0 99.0 99.0 99.0 99.0 99.0
  51.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  51.5  324.5 -39.0 -45.8  49.6  999.0  999.0 999.0 999.0 -15.3  999.000 999.000 999.0 999.0   184.8 99.0 99.0 99.0 99.0 99.0 99.0
  51.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  51.0  324.1 -39.0 -46.0  49.1  999.0  999.0 999.0 999.0 -15.3  999.000 999.000 999.0 999.0   192.5 99.0 99.0 99.0 99.0 99.0 99.0
  50.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  50.5  323.8 -39.1 -46.1  48.6  999.0  999.0 999.0 999.0 -15.4  999.000 999.000 999.0 999.0   200.2 99.0 99.0 99.0 99.0 99.0 99.0
  50.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  50.0  323.4 -39.1 -46.3  48.1  999.0  999.0 999.0 999.0 -15.4  999.000 999.000 999.0 999.0   207.9 99.0 99.0 99.0 99.0 99.0 99.0
  49.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  49.5  323.0 -39.2 999.0 999.0  999.0  999.0 999.0 999.0 -15.5  999.000 999.000 999.0 999.0   215.7 99.0 99.0 99.0 99.0 99.0 99.0
  49.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  49.0  322.7 -39.2 999.0 999.0  999.0  999.0 999.0 999.0 -15.5  999.000 999.000 999.0 999.0   223.4 99.0 99.0 99.0 99.0 99.0 99.0
  48.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  48.5  322.3 -39.3 999.0 999.0  999.0  999.0 999.0 999.0 -15.6  999.000 999.000 999.0 999.0   231.2 99.0 99.0 99.0 99.0 99.0 99.0
  48.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  48.0  321.9 -39.3 999.0 999.0  999.0  999.0 999.0 999.0 -15.7  999.000 999.000 999.0 999.0   239.0 99.0 99.0 99.0 99.0 99.0 99.0
  47.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  47.5  321.6 -39.4 999.0 999.0  999.0  999.0 999.0 999.0 -15.7  999.000 999.000 999.0 999.0   246.8 99.0 99.0 99.0 99.0 99.0 99.0
  47.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  47.0  321.2 -39.4 999.0 999.0  999.0  999.0 999.0 999.0 -15.8  999.000 999.000 999.0 999.0   254.6 99.0 99.0 99.0 99.0 99.0 99.0
  46.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  46.5  320.8 -39.5 999.0 999.0  999.0  999.0 999.0 999.0 -15.9  999.000 999.000 999.0 999.0   262.5 99.0 99.0 99.0 99.0 99.0 99.0
  46.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  46.0  320.5 -39.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.0  999.000 999.000 999.0 999.0   270.5 99.0 99.0 99.0 99.0 99.0 99.0
  45.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  45.5  320.1 -39.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   278.5 99.0 99.0 99.0 99.0 99.0 99.0
  45.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  45.0  319.7 -39.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   286.6 99.0 99.0 99.0 99.0 99.0 99.0
  44.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  44.5  319.3 -39.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   294.8 99.0 99.0 99.0 99.0 99.0 99.0
  44.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  44.0  318.9 -39.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   302.9 99.0 99.0 99.0 99.0 99.0 99.0
  43.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  43.5  318.6 -39.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   311.1 99.0 99.0 99.0 99.0 99.0 99.0
  43.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  43.0  318.2 -39.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   319.2 99.0 99.0 99.0 99.0 99.0 99.0
  42.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  42.5  317.8 -39.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   327.4 99.0 99.0 99.0 99.0 99.0 99.0
  42.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  42.0  317.4 -40.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   335.5 99.0 99.0 99.0 99.0 99.0 99.0
  41.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  41.5  317.1 -40.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   343.6 99.0 99.0 99.0 99.0 99.0 99.0
  41.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  41.0  316.7 -40.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   351.7 99.0 99.0 99.0 99.0 99.0 99.0
  40.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  40.5  316.3 -40.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   359.9 99.0 99.0 99.0 99.0 99.0 99.0
  40.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  40.0  315.9 -40.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   368.0 99.0 99.0 99.0 99.0 99.0 99.0
  39.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  39.5  315.5 -40.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   376.1 99.0 99.0 99.0 99.0 99.0 99.0
  39.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  39.0  315.2 -40.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   384.1 99.0 99.0 99.0 99.0 99.0 99.0
  38.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  38.5  314.8 -40.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   392.2 99.0 99.0 99.0 99.0 99.0 99.0
  38.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  38.0  314.4 -40.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   400.2 99.0 99.0 99.0 99.0 99.0 99.0
  37.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  37.5  314.1 -40.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   408.2 99.0 99.0 99.0 99.0 99.0 99.0
  37.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  37.0  313.7 -40.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   416.3 99.0 99.0 99.0 99.0 99.0 99.0
  36.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  36.5  313.3 -40.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   424.3 99.0 99.0 99.0 99.0 99.0 99.0
  36.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  36.0  313.0 -40.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   432.4 99.0 99.0 99.0 99.0 99.0 99.0
  35.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  35.5  312.6 -40.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   440.4 99.0 99.0 99.0 99.0 99.0 99.0
  35.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  35.0  312.2 -40.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   448.5 99.0 99.0 99.0 99.0 99.0 99.0
  34.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  34.5  311.8 -40.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.1  999.000 999.000 999.0 999.0   456.6 99.0 99.0 99.0 99.0 99.0 99.0
  34.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  34.0  311.5 -40.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   464.7 99.0 99.0 99.0 99.0 99.0 99.0
  33.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  33.5  311.1 -40.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   472.8 99.0 99.0 99.0 99.0 99.0 99.0
  33.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  33.0  310.7 -40.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   480.9 99.0 99.0 99.0 99.0 99.0 99.0
  32.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  32.5  310.4 -40.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   489.0 99.0 99.0 99.0 99.0 99.0 99.0
  32.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  32.0  310.0 -41.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.2  999.000 999.000 999.0 999.0   497.1 99.0 99.0 99.0 99.0 99.0 99.0
  31.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  31.5  309.6 -41.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   505.2 99.0 99.0 99.0 99.0 99.0 99.0
  31.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  31.0  309.3 -41.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   513.3 99.0 99.0 99.0 99.0 99.0 99.0
  30.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  30.5  308.9 -41.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.3  999.000 999.000 999.0 999.0   521.4 99.0 99.0 99.0 99.0 99.0 99.0
  30.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  30.0  308.5 -41.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   529.6 99.0 99.0 99.0 99.0 99.0 99.0
  29.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  29.5  308.1 -41.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   537.8 99.0 99.0 99.0 99.0 99.0 99.0
  29.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  29.0  307.8 -41.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   546.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.5  307.4 -41.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   554.2 99.0 99.0 99.0 99.0 99.0 99.0
  28.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  28.0  307.0 -41.3 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   562.4 99.0 99.0 99.0 99.0 99.0 99.0
  27.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.5  306.6 -41.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   570.7 99.0 99.0 99.0 99.0 99.0 99.0
  27.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  27.0  306.3 -41.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   579.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.5  305.9 -41.4 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   587.3 99.0 99.0 99.0 99.0 99.0 99.0
  26.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  26.0  305.5 -41.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   595.6 99.0 99.0 99.0 99.0 99.0 99.0
  25.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  25.5  305.2 -41.5 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   603.9 99.0 99.0 99.0 99.0 99.0 99.0
  25.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  25.0  304.8 -41.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   612.2 99.0 99.0 99.0 99.0 99.0 99.0
  24.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  24.5  304.4 -41.6 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   620.5 99.0 99.0 99.0 99.0 99.0 99.0
  24.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  24.0  304.0 -41.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   628.7 99.0 99.0 99.0 99.0 99.0 99.0
  23.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.5  303.7 -41.7 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   637.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  23.0  303.3 -41.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   645.3 99.0 99.0 99.0 99.0 99.0 99.0
  22.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  22.5  302.9 -41.8 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   653.6 99.0 99.0 99.0 99.0 99.0 99.0
  22.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  22.0  302.5 -41.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   661.9 99.0 99.0 99.0 99.0 99.0 99.0
  21.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  21.5  302.2 -41.9 999.0 999.0  999.0  999.0 999.0 999.0 -16.5  999.000 999.000 999.0 999.0   670.2 99.0 99.0 99.0 99.0 99.0 99.0
  21.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  21.0  301.8 -42.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   678.4 99.0 99.0 99.0 99.0 99.0 99.0
  20.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  20.5  301.4 -42.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   686.7 99.0 99.0 99.0 99.0 99.0 99.0
  20.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  20.0  301.1 -42.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.6  999.000 999.000 999.0 999.0   694.9 99.0 99.0 99.0 99.0 99.0 99.0
  19.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  19.5  300.7 -42.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   703.2 99.0 99.0 99.0 99.0 99.0 99.0
  19.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  19.0  300.3 -42.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.8  999.000 999.000 999.0 999.0   711.5 99.0 99.0 99.0 99.0 99.0 99.0
  18.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  18.5  300.0 -42.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.8  999.000 999.000 999.0 999.0   719.9 99.0 99.0 99.0 99.0 99.0 99.0
  18.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  18.0  299.6 -42.2 999.0 999.0  999.0  999.0 999.0 999.0 -16.9  999.000 999.000 999.0 999.0   728.4 99.0 99.0 99.0 99.0 99.0 99.0
  17.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  17.5  299.2 -42.3 999.0 999.0  999.0  999.0 999.0 999.0 -17.0  999.000 999.000 999.0 999.0   736.9 99.0 99.0 99.0 99.0 99.0 99.0
  17.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  17.0  298.8 -42.3 999.0 999.0  999.0  999.0 999.0 999.0 -17.1  999.000 999.000 999.0 999.0   745.5 99.0 99.0 99.0 99.0 99.0 99.0
  16.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  16.5  298.5 -42.3 999.0 999.0  999.0  999.0 999.0 999.0 -17.1  999.000 999.000 999.0 999.0   754.1 99.0 99.0 99.0 99.0 99.0 99.0
  16.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  16.0  298.1 -42.4 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   762.7 99.0 99.0 99.0 99.0 99.0 99.0
  15.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.5  297.7 -42.4 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   771.3 99.0 99.0 99.0 99.0 99.0 99.0
  15.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  15.0  297.3 -42.5 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   779.9 99.0 99.0 99.0 99.0 99.0 99.0
  14.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  14.5  296.9 -42.5 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   788.5 99.0 99.0 99.0 99.0 99.0 99.0
  14.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  14.0  296.6 -42.6 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   797.1 99.0 99.0 99.0 99.0 99.0 99.0
  13.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  13.5  296.2 -42.6 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   805.6 99.0 99.0 99.0 99.0 99.0 99.0
  13.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  13.0  295.8 -42.7 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   814.2 99.0 99.0 99.0 99.0 99.0 99.0
  12.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.5  295.4 -42.7 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   822.8 99.0 99.0 99.0 99.0 99.0 99.0
  12.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  12.0  295.1 -42.8 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   831.3 99.0 99.0 99.0 99.0 99.0 99.0
  11.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  11.5  294.7 -42.8 999.0 999.0  999.0  999.0 999.0 999.0 -17.2  999.000 999.000 999.0 999.0   839.8 99.0 99.0 99.0 99.0 99.0 99.0
  11.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  11.0  294.3 -42.9 999.0 999.0  999.0  999.0 999.0 999.0 -17.1  999.000 999.000 999.0 999.0   848.3 99.0 99.0 99.0 99.0 99.0 99.0
  10.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  10.5  293.9 -42.9 999.0 999.0  999.0  999.0 999.0 999.0 -17.1  999.000 999.000 999.0 999.0   856.8 99.0 99.0 99.0 99.0 99.0 99.0
  10.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  10.0  293.6 -42.9 999.0 999.0  999.0  999.0 999.0 999.0 -17.0  999.000 999.000 999.0 999.0   865.3 99.0 99.0 99.0 99.0 99.0 99.0
   9.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   9.5  293.2 -43.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.8  999.000 999.000 999.0 999.0   873.8 99.0 99.0 99.0 99.0 99.0 99.0
   9.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   9.0  292.8 -43.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.7  999.000 999.000 999.0 999.0   882.3 99.0 99.0 99.0 99.0 99.0 99.0
   8.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   8.5  292.5 -43.0 999.0 999.0  999.0  999.0 999.0 999.0 -16.4  999.000 999.000 999.0 999.0   890.7 99.0 99.0 99.0 99.0 99.0 99.0
   8.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   8.0  292.1 -43.1 999.0 999.0  999.0  999.0 999.0 999.0 -16.0  999.000 999.000 999.0 999.0   899.1 99.0 99.0 99.0 99.0 99.0 99.0
   7.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   7.5  291.8 -43.1 999.0 999.0  999.0  999.0 999.0 999.0 -15.6  999.000 999.000 999.0 999.0   907.3 99.0 99.0 99.0 99.0 99.0 99.0
   7.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   7.0  291.4 -43.2 999.0 999.0  999.0  999.0 999.0 999.0 -15.1  999.000 999.000 999.0 999.0   915.3 99.0 99.0 99.0 99.0 99.0 99.0
   6.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.5  291.1 -43.2 999.0 999.0  999.0  999.0 999.0 999.0 -14.6  999.000 999.000 999.0 999.0   923.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   6.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   5.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   4.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   3.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   2.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   1.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.8 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.5 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.2 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
   0.0 9999.0 999.0 999.0 999.0  999.0  999.0 999.0 999.0  99.0  999.000 999.000 999.0 999.0 99999.0 99.0 99.0 99.0 99.0 99.0 99.0
  -1.0  287.3 -45.0 -45.9  90.6  999.0  999.0 999.0 999.0  99.0 -128.433  35.830 999.0 999.0  1010.4 99.0 99.0 99.0 99.0 99.0 99.0
